(Packets Drop Metric, for Random Packet Drops)

Per-Flow Arrival Rate(%)

Flow’s Percent of Drops (Packets)

0 20 40 60 80 100

0 20 40 60 80 100

1 11 1 1 111 1 11 1 1 1 1 111111 111 111 11 1 1 2 2 2 2222222222222 2222222222222222 2 3 3 33 3 33 3 3 3 33 3 33 3 3 3 3 3 3 33 33333 33 33 3

2020 20 20

2020 20 2020 2020202020 20 2020 20 2020 20 202020 20 20202020 20202020

2121 21 21 21 21 212121212121 21 21 2121 21212121 21 21 21 21 2121 21 21212121

21 18 18 18 18 18 18 18 18 18 1818 18

18 18

18181818

1818 18 1818 18 1818 1818

1818

1818 18 19 19 19 19 19 19 19 19 19 19 19191919 19 1919

191919

19 19 19 19 1919 1919

1919 19 194 4 44 4 4 4 4 4 4 4 4 4 44 4 4 44 44 4 4 4 4 44555555555555 6 666 6 6666666666666666666 77777777777777 7 7 8 8 8 8 8 8 88 8 888 8888 8 8 8 8 999 999999 999

10101010

1010